Title: #3 Ancient Greek Architecture learning quiz
Course: Art History > Section: Greek Art

Answer the following questions with 100% accuracy you can use any resource available to you just make sure your sources are credible. Print off the quiz complete it and turn it in.

1. The main focus of Greek architecture was on:

a. tombs.
b. civic builings.
c. castles.
d. lavish houses.

2. The Greek civilization made advancements on:

a. city planning.
b. water utilities.
c. architecture.
d. all of the above

3. The most important of civic architecture was the:

a. temple.
b. city hall.
c. theater.
d. burial facilities.

4. Temples were classified by the:

a. god it honored.
b. style of roof.
c. number of columns across the front.

5.The four walled core of the temple was the:

a. viola.
b. cella.
c. quadrangle.
d. treasure room.

6. The Doric order is:

a. most elaborate.
b. least sturdy.
c. most difficult to construct.
d. most simplistic.

7. Doric columns had ____ vertical flutes.

a. 5
b. 10
c. 15
d. 20

8. The most distinctive feature of the Ionic column was the:

a. base.
b. capital.
c. flute.
d. abacus.

9. The Corinthian order was a ________ the Ionic order.

a. variant of
b. contrast to
c. departure from
d. duplication of

10. The most ornate of the three orders was the:

a. Doric
b. Ionic
c. Corinthian
d. Hellenes