Course: Technology Applications

Visions Weeks 6, 7 & 8

In this unit, students will learn about
- software specialization for desktop publishing
- software specialization for photo editing
- layout elements and practices, including text and graphical elements, grid layout, white space, justification, font & color use, and balance
- layout principles, including use of elements for formal or casual purpose

Students will complete, practice, or attain skills with
- desktop publishing
- templates
- graphics
- image devices

Students will evaluate
- documents for suitability of a stated purpose (formal or casual)
- documents for standards of communication
- hardware for connectivity to existing computer scenarios

Students will exhibit in a digital portfolio
- an advertising example
- a polarized photograph
- a single color enhanced or color-tone dominant document

Lesson 1: Learning About Design

Additional Resources & Activities

DESIGN for PRINT

IMAGING DEVICES

GRAPHICS

EVALUATION