Title: How to use Jing-practice for drawing your electrical diagrams
Course: Electricity (4th Grade)

You will need to know how to use this as you start to draw your own diagrams of electrical circuits. This will get you started playing with Jing so when it comes time to draw electrical diagrams you will have practice.