Title: angle
Course: Physics copy 1

Q: Three particles are arranged as shown on the diagram.

q_1=9 uC
q_2=6 uC
q_3=3 uC

r_13=1 m.
r_23=1.1 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 29 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=2 uC
q_2=7 uC
q_3=6 uC

r_13=1 m.
r_23=1.1 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 71 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=3 uC
q_2=10 uC
q_3=8 uC

r_13=0.8 m.
r_23=1 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 65 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=2 uC
q_2=4 uC
q_3=7 uC

r_13=0.7 m.
r_23=0.9 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 50 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=6 uC
q_2=3 uC
q_3=8 uC

r_13=1 m.
r_23=1.2 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 19 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=10 uC
q_2=6 uC
q_3=1 uC

r_13=0.3 m.
r_23=0.6 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 8.5 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=6 uC
q_2=8 uC
q_3=4 uC

r_13=0.6 m.
r_23=0.9 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 31 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=4 uC
q_2=2 uC
q_3=7 uC

r_13=0.9 m.
r_23=1.2 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 16 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=9 uC
q_2=4 uC
q_3=7 uC

r_13=0.7 m.
r_23=0.8 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 19 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=9 uC
q_2=7 uC
q_3=8 uC

r_13=0.5 m.
r_23=0.8 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 17 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=9 uC
q_2=3 uC
q_3=5 uC

r_13=0.3 m.
r_23=0.4 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 11 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=8 uC
q_2=9 uC
q_3=9 uC

r_13=0.1 m.
r_23=0.2 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 16 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=10 uC
q_2=2 uC
q_3=5 uC

r_13=0.9 m.
r_23=1 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 9.2 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=9 uC
q_2=4 uC
q_3=9 uC

r_13=1 m.
r_23=1.3 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 15 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=9 uC
q_2=10 uC
q_3=1 uC

r_13=0.7 m.
r_23=0.8 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 40 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=6 uC
q_2=4 uC
q_3=3 uC

r_13=0.2 m.
r_23=0.4 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 9.5 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=4 uC
q_2=5 uC
q_3=4 uC

r_13=0.6 m.
r_23=0.9 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 29 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=4 uC
q_2=9 uC
q_3=5 uC

r_13=0.6 m.
r_23=0.8 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 52 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=7 uC
q_2=1 uC
q_3=4 uC

r_13=0.1 m.
r_23=0.4 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 0.51 (± 1)

Q: Three particles are arranged as shown on the diagram.

q_1=8 uC
q_2=5 uC
q_3=4 uC

r_13=0.8 m.
r_23=0.9 m.

The direction of the net force on q_3 is_____ degrees.

(Enter your answer correct to one degree)
A: 26 (± 1)