Title: EPE 05
Course: Physics copy 1

Q: A point charge of magintiude q_1= 4 uC generates an electric field. The electric potential difference betwen a point 1.6 m and 0.9 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 18000

Q: A point charge of magintiude q_1= 4 uC generates an electric field. The electric potential difference betwen a point 1.3 m and 0.8 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 17000

Q: A point charge of magintiude q_1= 6 uC generates an electric field. The electric potential difference betwen a point 1.1 m and 0.5 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 59000

Q: A point charge of magintiude q_1= 8 uC generates an electric field. The electric potential difference betwen a point 1.9 m and 0.9 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 42000

Q: A point charge of magintiude q_1= 6 uC generates an electric field. The electric potential difference betwen a point 1.9 m and 0.8 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 39000

Q: A point charge of magintiude q_1= 5 uC generates an electric field. The electric potential difference betwen a point 1.6 m and 0.5 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 62000

Q: A point charge of magintiude q_1= 6 uC generates an electric field. The electric potential difference betwen a point 1.6 m and 1 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 20000

Q: A point charge of magintiude q_1= 6 uC generates an electric field. The electric potential difference betwen a point 1.1 m and 1 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 4900

Q: A point charge of magintiude q_1= 8 uC generates an electric field. The electric potential difference betwen a point 1.7 m and 1 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 30000

Q: A point charge of magintiude q_1= 8 uC generates an electric field. The electric potential difference betwen a point 1.4 m and 0.8 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 39000

Q: A point charge of magintiude q_1= 2 uC generates an electric field. The electric potential difference betwen a point 1.6 m and 0.8 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 11000

Q: A point charge of magintiude q_1= 4 uC generates an electric field. The electric potential difference betwen a point 1.5 m and 0.5 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 48000

Q: A point charge of magintiude q_1= 5 uC generates an electric field. The electric potential difference betwen a point 1.7 m and 0.8 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 30000

Q: A point charge of magintiude q_1= 7 uC generates an electric field. The electric potential difference betwen a point 1.4 m and 0.6 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 60000

Q: A point charge of magintiude q_1= 7 uC generates an electric field. The electric potential difference betwen a point 1.4 m and 0.8 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 34000

Q: A point charge of magintiude q_1= 7 uC generates an electric field. The electric potential difference betwen a point 1.9 m and 0.9 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 37000

Q: A point charge of magintiude q_1= 2 uC generates an electric field. The electric potential difference betwen a point 1.3 m and 0.9 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 6200

Q: A point charge of magintiude q_1= 7 uC generates an electric field. The electric potential difference betwen a point 1.1 m and 0.9 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 13000

Q: A point charge of magintiude q_1= 4 uC generates an electric field. The electric potential difference betwen a point 1.4 m and 1 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 10000

Q: A point charge of magintiude q_1= 5 uC generates an electric field. The electric potential difference betwen a point 1.4 m and 0.7 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 32000

Q: A point charge of magintiude q_1= 5 uC generates an electric field. The electric potential difference betwen a point 1.8 m and 0.8 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 31000

Q: A point charge of magintiude q_1= 2 uC generates an electric field. The electric potential difference betwen a point 1.6 m and 0.7 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 14000

Q: A point charge of magintiude q_1= 3 uC generates an electric field. The electric potential difference betwen a point 1.9 m and 0.5 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 40000

Q: A point charge of magintiude q_1= 7 uC generates an electric field. The electric potential difference betwen a point 1.4 m and 1 m away will be _____ V (Joules per Coulomb) | [Image: 1 Coulomb of charge moved a distance through a field]
A: 18000