Title: Path Difference
Course: Physics copy 1

Q: Felicia is experimenting with a ripple tank as shown to the right. She measures the distance from each source to a point of constructive interference.

The wavelength in this experiment was measured as 3.3 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a maximum in a ripple tank]
A: 3.3 (± 0.1)

Q: Justin is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 3.9 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 2 (± 0.1)

Q: Nick is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of constructive interference.

The wavelength in this experiment was measured as 1.5 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a maximum in a ripple tank]
A: 1.5 (± 0.1)

Q: Micah is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 1.8 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 4.5 (± 0.1)

Q: Ariel is experimenting with a ripple tank as shown to the right. She measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 3.9 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 2 (± 0.1)

Q: Peter is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 3.2 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 1.6 (± 0.1)

Q: Samantha is experimenting with a ripple tank as shown to the right. She measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 3.9 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 2 (± 0.1)

Q: Kate is experimenting with a ripple tank as shown to the right. She measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 4 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 10 (± 0.1)

Q: Kate is experimenting with a ripple tank as shown to the right. She measures the distance from each source to a point of constructive interference.

The wavelength in this experiment was measured as 2.2 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a maximum in a ripple tank]
A: 2.2 (± 0.1)

Q: Nick is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 3.3 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 1.7 (± 0.1)

Q: Bryn is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 1 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 0.5 (± 0.1)

Q: Micah is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of constructive interference.

The wavelength in this experiment was measured as 1.3 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a maximum in a ripple tank]
A: 1.3 (± 0.1)

Q: Mitchell is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 2 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 1 (± 0.1)

Q: Ariel is experimenting with a ripple tank as shown to the right. She measures the distance from each source to a point of constructive interference.

The wavelength in this experiment was measured as 1.9 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a maximum in a ripple tank]
A: 1.9 (± 0.1)

Q: Samantha is experimenting with a ripple tank as shown to the right. She measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 1.9 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 0.95 (± 0.1)

Q: Mitchell is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 3.3 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 5 (± 0.1)

Q: Kaley is experimenting with a ripple tank as shown to the right. She measures the distance from each source to a point of constructive interference.

The wavelength in this experiment was measured as 1.1 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer correct to two significant digits.
[Image: path difference to a maximum in a ripple tank]
A: 0 (± 0.1)

Q: Justin is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 2.5 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 6.3 (± 0.1)

Q: Justin is experimenting with a ripple tank as shown to the right. He measures the distance from each source to a point of destuctive intereference.

The wavelength in this experiment was measured as 1.9 cm. The absolute path length difference

$$\left | L_2-L_1 \right |$$

from each source to the point is _____ cm.

Enter your answer corrrect to two significant digits.
[Image: path difference to a nodal line in a ripple tank]
A: 4.8 (± 0.1)