Title: 03 find fringe distance
Course: Physics copy 1

Q: Kayla is using a double slit apparatus with a monochromatic light source of wavelength 510 nm. The distance between the plate slits is 0.0000823 m and his screen is set up 5 m from the light source. How far apart are the dark fringes?
- 0.031 m (Good shooting Tex)
- 0.043 m
- 0 m
- 0.019 m
- 0.012 m
A: 0.031 m

Q: Ariel is using a double slit apparatus with a monochromatic light source of wavelength 640 nm. The distance between the plate slits is 0.000291 m and his screen is set up 5 m from the light source. How far apart are the dark fringes?
- 0.011 m (Good shooting Tex)
- 0.015 m
- 0.018 m
- 0.009 m
- 0.004 m
A: 0.011 m

Q: David is using a double slit apparatus with a monochromatic light source of wavelength 580 nm. The distance between the plate slits is 0.0000193 m and his screen is set up 1 m from the light source. How far apart are the dark fringes?
- 0.03 m (Good shooting Tex)
- 0.042 m
- 0 m
- 0.018 m
- 0.012 m
A: 0.03 m

Q: Althea is using a double slit apparatus with a monochromatic light source of wavelength 470 nm. The distance between the plate slits is 0.0000979 m and his screen is set up 5 m from the light source. How far apart are the dark fringes?
- 0.024 m (Good shooting Tex)
- 0.034 m
- 0.038 m
- 0 m
- 0.019 m
A: 0.024 m

Q: Chris is using a double slit apparatus with a monochromatic light source of wavelength 570 nm. The distance between the plate slits is 0.000143 m and his screen is set up 3 m from the light source. How far apart are the dark fringes?
- 0.012 m (You got it Pontiac)
- 0.017 m
- 0.019 m
- 0.01 m
- 0.007 m
A: 0.012 m

Q: Ariel is using a double slit apparatus with a monochromatic light source of wavelength 610 nm. The distance between the plate slits is 0.0000469 m and his screen is set up 1 m from the light source. How far apart are the dark fringes?
- 0.013 m (Good shooting Tex)
- 0.018 m
- 0 m
- 0.008 m
- 0.026 m
A: 0.013 m

Q: Felicia is using a double slit apparatus with a monochromatic light source of wavelength 570 nm. The distance between the plate slits is 0.0000855 m and his screen is set up 3 m from the light source. How far apart are the dark fringes?
- 0.02 m (Good shooting Tex)
- 0.028 m
- 0 m
- 0.016 m
- 0.008 m
A: 0.02 m

Q: Brittany is using a double slit apparatus with a monochromatic light source of wavelength 450 nm. The distance between the plate slits is 0.0000136 m and his screen is set up 1 m from the light source. How far apart are the dark fringes?
- 0.033 m (Keep flying right)
- 0.04 m
- 0.053 m
- 0.026 m
- 0.02 m
A: 0.033 m

Q: Justin is using a double slit apparatus with a monochromatic light source of wavelength 560 nm. The distance between the plate slits is 0.000224 m and his screen is set up 4 m from the light source. How far apart are the dark fringes?
- 0.01 m (Good shooting Tex)
- 0.014 m
- 0.016 m
- 0.008 m
- 0.004 m
A: 0.01 m

Q: Kate is using a double slit apparatus with a monochromatic light source of wavelength 600 nm. The distance between the plate slits is 0.0000343 m and his screen is set up 2 m from the light source. How far apart are the dark fringes?
- 0.035 m (Good shooting Tex)
- 0.049 m
- 0 m
- 0.021 m
- 0.07 m
A: 0.035 m

Q: Micah is using a double slit apparatus with a monochromatic light source of wavelength 590 nm. The distance between the plate slits is 0.000197 m and his screen is set up 5 m from the light source. How far apart are the dark fringes?
- 0.015 m (Good shooting Tex)
- 0.018 m
- 0.021 m
- 0 m
- 0.012 m
A: 0.015 m