Title: magnitude
Course: Physics copy 1

Q: Three particles are arranged as shown on the diagram.

q_1=6 uC
q_2=7 uC
q_3=6 uC

r_13=0.3 m.
r_23=0.4 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 4.3

Q: Three particles are arranged as shown on the diagram.

q_1=5 uC
q_2=3 uC
q_3=2 uC

r_13=0.8 m.
r_23=0.9 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.16

Q: Three particles are arranged as shown on the diagram.

q_1=3 uC
q_2=8 uC
q_3=4 uC

r_13=0.5 m.
r_23=0.7 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.73

Q: Three particles are arranged as shown on the diagram.

q_1=4 uC
q_2=7 uC
q_3=5 uC

r_13=0.6 m.
r_23=0.8 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.7

Q: Three particles are arranged as shown on the diagram.

q_1=7 uC
q_2=9 uC
q_3=4 uC

r_13=0.9 m.
r_23=1.2 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.38

Q: Three particles are arranged as shown on the diagram.

q_1=2 uC
q_2=6 uC
q_3=7 uC

r_13=0.9 m.
r_23=1 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.41

Q: Three particles are arranged as shown on the diagram.

q_1=7 uC
q_2=6 uC
q_3=2 uC

r_13=0.8 m.
r_23=1.1 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.22

Q: Three particles are arranged as shown on the diagram.

q_1=7 uC
q_2=7 uC
q_3=10 uC

r_13=0.9 m.
r_23=1.2 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.89

Q: Three particles are arranged as shown on the diagram.

q_1=7 uC
q_2=2 uC
q_3=8 uC

r_13=0.4 m.
r_23=0.7 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 3.2

Q: Three particles are arranged as shown on the diagram.

q_1=10 uC
q_2=7 uC
q_3=5 uC

r_13=0.6 m.
r_23=0.8 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 1.3

Q: Three particles are arranged as shown on the diagram.

q_1=4 uC
q_2=4 uC
q_3=7 uC

r_13=1 m.
r_23=1.3 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.29

Q: Three particles are arranged as shown on the diagram.

q_1=4 uC
q_2=9 uC
q_3=9 uC

r_13=0.9 m.
r_23=1 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.83

Q: Three particles are arranged as shown on the diagram.

q_1=3 uC
q_2=1 uC
q_3=3 uC

r_13=0.4 m.
r_23=0.7 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.51

Q: Three particles are arranged as shown on the diagram.

q_1=8 uC
q_2=2 uC
q_3=3 uC

r_13=0.2 m.
r_23=0.5 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 5.4

Q: Three particles are arranged as shown on the diagram.

q_1=4 uC
q_2=7 uC
q_3=10 uC

r_13=0.6 m.
r_23=0.9 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 1.3

Q: Three particles are arranged as shown on the diagram.

q_1=6 uC
q_2=3 uC
q_3=1 uC

r_13=0.3 m.
r_23=0.5 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.61

Q: Three particles are arranged as shown on the diagram.

q_1=8 uC
q_2=4 uC
q_3=5 uC

r_13=0.9 m.
r_23=1 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.48

Q: Three particles are arranged as shown on the diagram.

q_1=9 uC
q_2=8 uC
q_3=10 uC

r_13=1 m.
r_23=1.1 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 1

Q: Three particles are arranged as shown on the diagram.

q_1=5 uC
q_2=1 uC
q_3=5 uC

r_13=0.8 m.
r_23=1.1 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 0.35

Q: Three particles are arranged as shown on the diagram.

q_1=7 uC
q_2=7 uC
q_3=1 uC

r_13=0.1 m.
r_23=0.4 m.

The magnitude of the net force on q_3 is_____ N.

(Enter your answer correct to two significant digits)
A: 6.3