Title: field intensity plates
Course: Physics copy 1

Q: Nick is preparing an oil drop experiment and his creates a parallel plate capacitor. There is an electric potential difference of 300 Volts between the plates. The seperation between the plates is 0.14 m. What is the field intensity between the plates? | [Image: plates with field between]
- 2100 N/C (Yes grasshopper)
- 15000 N/C
- 42 N/C
- 5.9 N/C
- 4600000 N/C
A: 2100 N/C

Q: Althea is preparing an oil drop experiment and her creates a parallel plate capacitor. There is an electric potential difference of 100 Volts between the plates. The seperation between the plates is 0.03 m. What is the field intensity between the plates? | [Image: plates with field between]
- 3300 N/C (Congratulations.)
- 110000 N/C
- 3 N/C
- 0.09 N/C
- 11000000 N/C
A: 3300 N/C

Q: Kayla is preparing an oil drop experiment and her creates a parallel plate capacitor. There is an electric potential difference of 300 Volts between the plates. The seperation between the plates is 0.2 m. What is the field intensity between the plates? | [Image: plates with field between]
- 1500 N/C (Right on Durango)
- 7500 N/C
- 60 N/C
- 12 N/C
- 2200000 N/C
A: 1500 N/C

Q: Althea is preparing an oil drop experiment and her creates a parallel plate capacitor. There is an electric potential difference of 400 Volts between the plates. The seperation between the plates is 0.03 m. What is the field intensity between the plates? | [Image: plates with field between]
- 13000 N/C (Keep up the good work and eat right)
- 440000 N/C
- 12 N/C
- 0.36 N/C
- 180000000 N/C
A: 13000 N/C

Q: Kaley is preparing an oil drop experiment and her creates a parallel plate capacitor. There is an electric potential difference of 400 Volts between the plates. The seperation between the plates is 0.14 m. What is the field intensity between the plates? | [Image: plates with field between]
- 2900 N/C (You got it Pontiac)
- 20000 N/C
- 56 N/C
- 7.8 N/C
- 8200000 N/C
A: 2900 N/C

Q: Ariel is preparing an oil drop experiment and her creates a parallel plate capacitor. There is an electric potential difference of 200 Volts between the plates. The seperation between the plates is 0.2 m. What is the field intensity between the plates? | [Image: plates with field between]
- 1000 N/C (Keep up the good work and eat right)
- 5000 N/C
- 40 N/C
- 8 N/C
- 1000000 N/C
A: 1000 N/C

Q: Kayla is preparing an oil drop experiment and her creates a parallel plate capacitor. There is an electric potential difference of 400 Volts between the plates. The seperation between the plates is 0.16 m. What is the field intensity between the plates? | [Image: plates with field between]
- 2500 N/C (You are dwelling in the halls of rightnous)
- 16000 N/C
- 64 N/C
- 10 N/C
- 6300000 N/C
A: 2500 N/C

Q: Kyle is preparing an oil drop experiment and his creates a parallel plate capacitor. There is an electric potential difference of 200 Volts between the plates. The seperation between the plates is 0.19 m. What is the field intensity between the plates? | [Image: plates with field between]
- 1100 N/C (Good shooting Tex)
- 5500 N/C
- 38 N/C
- 7.2 N/C
- 1100000 N/C
A: 1100 N/C

Q: Ariel is preparing an oil drop experiment and her creates a parallel plate capacitor. There is an electric potential difference of 400 Volts between the plates. The seperation between the plates is 0.18 m. What is the field intensity between the plates? | [Image: plates with field between]
- 2200 N/C (You are dwelling in the halls of rightnous)
- 12000 N/C
- 72 N/C
- 13 N/C
- 4900000 N/C
A: 2200 N/C

Q: Kayla is preparing an oil drop experiment and her creates a parallel plate capacitor. There is an electric potential difference of 200 Volts between the plates. The seperation between the plates is 0.13 m. What is the field intensity between the plates? | [Image: plates with field between]
- 1500 N/C (You got it Pontiac)
- 12000 N/C
- 26 N/C
- 3.4 N/C
- 2400000 N/C
A: 1500 N/C

Q: Kate is preparing an oil drop experiment and her creates a parallel plate capacitor. There is an electric potential difference of 200 Volts between the plates. The seperation between the plates is 0.17 m. What is the field intensity between the plates? | [Image: plates with field between]
- 1200 N/C (Keep up the good work and eat right)
- 6900 N/C
- 34 N/C
- 5.8 N/C
- 1400000 N/C
A: 1200 N/C