Title: find coefficient
Course: Physics copy 1

Q: A box on a horizontal plane has a mass of 150kg, and the maximum horizontal force that can be applied with no motion is 200N. The coefficient of static friction is _____ Enter your answer correct to two significant digits.
A: 0.14 (± 0.01)

Q: A box on a horizontal plane has a mass of 110kg, and the maximum horizontal force that can be applied with no motion is 55N. The coefficient of static friction is _____ Enter your answer correct to two significant digits.
A: 0.051 (± 0.01)

Q: A box on a horizontal plane has a mass of 150kg, and the maximum horizontal force that can be applied with no motion is 604N. The coefficient of static friction is _____ Enter your answer correct to two significant digits.
A: 0.41 (± 0.01)

Q: A box on a horizontal plane has a mass of 10kg, and the maximum horizontal force that can be applied with no motion is 72N. The coefficient of static friction is _____ Enter your answer correct to two significant digits.
A: 0.73 (± 0.01)

Q: A box on a horizontal plane has a mass of 70kg, and the maximum horizontal force that can be applied with no motion is 546N. The coefficient of static friction is _____ Enter your answer correct to two significant digits.
A: 0.8 (± 0.01)

Q: A box on a horizontal plane has a mass of 10kg, and the maximum horizontal force that can be applied with no motion is 82N. The coefficient of static friction is _____ Enter your answer correct to two significant digits.
A: 0.84 (± 0.01)

Q: A box on a horizontal plane has a mass of 10kg, and the maximum horizontal force that can be applied with no motion is 56N. The coefficient of static friction is _____ Enter your answer correct to two significant digits.
A: 0.57 (± 0.01)

Q: A box on a horizontal plane has a mass of 140kg, and the maximum horizontal force that can be applied with no motion is 212N. The coefficient of static friction is _____ Enter your answer correct to two significant digits.
A: 0.15 (± 0.01)

Q: A box on a horizontal plane has a mass of 110kg, and the maximum horizontal force that can be applied with no motion is 681N. The coefficient of static friction is _____ Enter your answer correct to two significant digits.
A: 0.63 (± 0.01)

Q: A box on a horizontal plane has a mass of 30kg, and the maximum horizontal force that can be applied with no motion is 237N. The coefficient of static friction is _____ Enter your answer correct to two significant digits.
A: 0.81 (± 0.01)