Course: Bridges: To Get to the Other Side - Elementary

The Bridge: You Test It!

Now that your bridge is constructed according to the Penneville Town Council's requirements, it is time to test your design.

Directions:
Test the strength and durability of your bridge by rolling the baseball from one end of the bridge to the other. You may do this as many times as your group would like, however it costs $100 per trial. Feel free to modify and adjust your bridge during this time.